// Archive is legacy/test data only — not part of the live signal stack.
// noindex keeps it out of search results (duplicate/thin content risk)
// while keeping it accessible to logged-in users for inspection.
import type { Metadata } from 'next'
import ArchivePageClient from './ArchivePageClient'

export const metadata: Metadata = {
  robots: { index: false, follow: false },
}

export default function ArchivePage() {
  return <ArchivePageClient />
}
